Try OandS Fonts

Peter Wilson

peter.r.wilson@boeing.com

This provides a short test of the characters in the Odds and Sods font — the oands font family.

The font in Large size ‘ z The font — ‘ z — in its normal size and the Computer Modern Roman — ‘ z — for comparison

The font — ‘ z — in its normal size and italic and the Computer Modern Roman — ‘ z — for comparison

This is the end of the test file.

Table 1: Characters and commands Symbol Name Command ‘ Mirrored right quote ‘ z Glottal stop z