% psibycus.sty-- P.A.  MacKay -- July 16, 1999
% Pierre A. MacKay, Dept. of Classics, University of Washington
% mackay@cs.washington.edu
% ------------------------
% 15/7/99  Version for type1 font IbycusHTG-Regular
% 12/7/97  Convert to ibycus4
% 4/12/95  Test for isolatin package and suppress ibycus3.map if it's there
% 31/10/95 Added \input{iby3extr} for editor symbols
% 25/1/95  Created.
%
% For use with LaTeX2e
% Replaces iby4text.tex; does not call setiby4.tex
% Use "\fontsize{14}{17pt}\selectfont" instead of "\setgreek14/17"
% and "{\greek{}...}" instead of "\GK{}...\RM{}"
% The fd file is named as it should be, for ``Unknown'' encoding
% even though I have to use OT1 in the actual file
%
\newtoks\digraphs
\digraphs={tlgsqq}
\chardef \atcode = \the \catcode `\@
\def\unletterat{\catcode`\@ = \the \atcode}
\catcode`\@ = 11
\ifx\@grave@A@grave@\undefined\input{ibycus4.map}
\else\@latex@warning@no@line{%
No GreekKeys upper ASCII. Post-positive ASCII sequences only}\fi
% Don't use the GreekKeys equivalents if isolatin is in use.
\unletterat
\input{Uibycus.fd}
\def\greek{\fontfamily{ibycus}\selectfont}
\input{iby4extr}

