\input heading
%\newbox\graph
\addtolength{\textwidth}{3cm}
\addtolength{\hoffset}{-1.5cm}
\addtolength{\textheight}{4cm}
\addtolength{\voffset}{-2cm}
\setcounter{topnumber}{3}


\begin{document}
\title{M4 Macros for Electric Circuit Diagrams in \LaTeX\ Documents}
\author{Dwight Aplevich}
\date{%
\input Version
}
\maketitle

\input body

\bibliographystyle{plain}
\bibliography{man}
   \end{document}
