% Date: Tue, 2 May 2000 17:27:38 -0400
% From: "Peter Kabal" <kabal@ece.mcgill.ca>
% To: <karl@cs.umb.edu>
% Subject: eplain interaction with TeXdraw
% 
% A TeXdraw user alerted me to the fact that the TeXdraw routines gave a
% warning  message when used together with eplain.  It seems that eplain
% defines \iterate
% differently than plain tex.  Using plain TeX, there is no problem, but using
% eplain one there is.

\input eplain

\input texdraw
\btexdraw
  \lpatt(0.1 0.1)
\etexdraw

\bye
